-- Dříve upravené COMMENT v rámci V044; po pravidle Flyway jen nová migrace (checksum V044 nesmí měnit).
COMMENT ON COLUMN ems.asset_inverter.deye_register_max_charge_a IS
    'Optional A for reg 108; EMS uses COALESCE(this, FLOOR(LEAST(W)/51.2)) in _load_inverter_config.';
COMMENT ON COLUMN ems.asset_inverter.deye_register_max_discharge_a IS
    'Optional A for reg 109; EMS uses COALESCE(this, FLOOR(LEAST(W)/51.2)) in _load_inverter_config.';
