-- Tune battery economics for planning behavior:
-- - lower reserve SOC to allow economically justified discharge
-- - lower degradation cost to avoid overly conservative cycling
--
-- Idempotent update for currently deployed sites.
UPDATE ems.asset_battery
SET
  reserve_soc_percent = 10.00,
  degradation_cost_czk_kwh = 0.1500
WHERE reserve_soc_percent <> 10.00
   OR degradation_cost_czk_kwh <> 0.1500;
