-- Odstraněno v39: kalibrace discharge_calibration_factor nahrazena opravou SoC bilance (jen bd, ne bd+ge_bat).

drop function if exists ems.fn_soc_tracking_bundle(
  int,
  timestamptz,
  numeric,
  numeric,
  numeric,
  numeric
);
